<script setup>
const isSnackbarVisible = ref(false)
</script>

<template>
  <VBtn @click="isSnackbarVisible = true">
    Open Snackbar
  </VBtn>

  <!-- Snackbar -->
  <VSnackbar
    v-model="isSnackbarVisible"
    :timeout="2000"
  >
    My timeout is set to 2000.
  </VSnackbar>
</template>
